Quintiq file version 2.0
#root
#parent: SanityCheckingBase
OrphanComponent SCK_DialogSanityCheckBase
{
  #keys: '[132254.0.10958337]'
  BaseType: 'Dialog'
  GBLayout
  {
    Type: 'GBLayoutDefinition'
    Columns:
    [
      GBFlow.Column { grow: 128 id: 156 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => SplitterWnd
        Position { startcolumn: 156 startrow: 398 endcolumn: 156 endrow: 398 }
      }
    ]
    Gaps: [ left: 0 right: 0 top: 0 bottom: 0 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 128 id: 398 parent: 0 }
    ]
  }
  Children:
  [
    #child: Toolbar
    #child: SplitterWnd
  ]
  Properties:
  [
    Height: 333
    Title: 'Sanity check'
    Width: 429
    ModeledStringList ChildOrdering
    {
      c: Toolbar
      c: SplitterWnd
    }
  ]
}
