Quintiq file version 2.0
#parent: CheckBoxDefaultMaxDuration
Response OnUserChange () id:Response_DialogCreateEditCampaignType_CheckBoxDefaultMaxDuration_OnUserChange
{
  #keys: '[143600.0.1231619623]'
  Body:
  [*
    //Reset the default max duration value if it is unchecked
    if( not this.Checked() )
    {
      GUIDurationSelectorMaxDuration.Duration( Duration::Zero() );
      Dialog.Data().DefaultMaxDuration( Duration::Zero() );
    }
    
    GUIDurationSelectorMaxDuration.Enabled( this.Checked() );
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_CheckBox_OnUserChange'
}
