Quintiq file version 2.0
Component GroupPanel404
{
  #keys: '[131962.0.10558528]'
  BaseType: 'GroupPanel'
  ViewSecurity: 'SafetyStockCalculation'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 105 parent: 0 }
      GBFlow.Column { grow: 0 id: 805 parent: 0 }
      GBFlow.Column { grow: 0 id: 532 parent: 0 }
      GBFlow.Column { grow: 0 id: 438 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => CheckBoxBatchEditStandardDeviationLeadTime
        Position { startcolumn: 105 startrow: 553 endcolumn: 105 endrow: 553 }
      }
      GBElement
      {
        Component => CheckBoxHasStandardDeviationLeadTimeLaneLeg
        Position { startcolumn: 805 startrow: 553 endcolumn: 805 endrow: 553 }
      }
      GBElement
      {
        Component => LabelOverrideLaneStandardDeviationLeadTime
        Position { startcolumn: 532 startrow: 553 endcolumn: 532 endrow: 553 }
      }
      GBElement
      {
        Component => GUIDurationSelectorStandardDeviationLeadTimeLaneLeg
        Position { startcolumn: 438 startrow: 553 endcolumn: 438 endrow: 553 }
      }
    ]
    Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 553 parent: 0 }
    ]
  }
  Children:
  [
    Component CheckBoxBatchEditStandardDeviationLeadTime
    {
      #keys: '[131962.0.10558829]'
      BaseType: 'CheckBox'
      ViewSecurity: 'SafetyStockCalculation'
      Properties:
      [
        Text: ''
      ]
    }
    Component CheckBoxHasStandardDeviationLeadTimeLaneLeg
    {
      #keys: '[131962.0.10558830]'
      BaseType: 'CheckBox'
      ViewSecurity: 'SafetyStockCalculation'
      Properties:
      [
        DataBinding: 'Dialog.Data.HasStandardDeviationLeadTimeLaneLeg'
        Text: ''
      ]
    }
    Component LabelOverrideLaneStandardDeviationLeadTime
    {
      #keys: '[131962.0.10558831]'
      BaseType: 'Label'
      ViewSecurity: 'SafetyStockCalculation'
      Properties:
      [
        Alignment: 'right'
        FocusControl: 'GUIDurationSelectorStandardDeviationLeadTimeLaneLeg'
        Shortcut: 'Alt+T'
        Text: 'Override s&tandard deviation lead time of lane'
        Tooltip: '<html>This represents uncertainty in the lead time and is only relevant when calculation of safety stock levels is used<br>Click to override the default standard deviation lead time defined on the lane</html>'
        Transparent: true
      ]
    }
    Component GUIDurationSelectorStandardDeviationLeadTimeLaneLeg
    {
      #keys: '[131962.0.10558832]'
      BaseType: 'GUIDurationSelector'
      ViewSecurity: 'SafetyStockCalculation'
      Properties:
      [
        BackgroundColor: 'Window'
        CanBeNegative: false
        DataBinding: 'Dialog.Data.StandardDeviationLeadTime'
      ]
    }
  ]
  Properties:
  [
    Text: 'Safety stock'
    ModeledStringList ChildOrdering
    {
      c: CheckBoxBatchEditStandardDeviationLeadTime
      c: CheckBoxHasStandardDeviationLeadTimeLaneLeg
      c: LabelOverrideLaneStandardDeviationLeadTime
      c: GUIDurationSelectorStandardDeviationLeadTimeLaneLeg
    }
  ]
}
