Quintiq file version 2.0
Component GroupPanelGeneral
{
  #keys: '[113694.1.1943244719]'
  BaseType: 'GroupPanel'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 20 parent: 0 }
      GBFlow.Column { grow: 128 id: 18 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => CheckBox
        Position { startcolumn: 18 startrow: 7 endcolumn: 18 endrow: 7 }
      }
      GBElement
      {
        Component => LabelGridPointDistance
        Position { startcolumn: 20 startrow: 5 endcolumn: 20 endrow: 5 }
      }
      GBElement
      {
        Component => /EditorGridPointDistance
        Position { startcolumn: 18 startrow: 5 endcolumn: 18 endrow: 5 }
      }
    ]
    Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 7 parent: 0 }
      GBFlow.Row { grow: 0 id: 5 parent: 0 }
    ]
  }
  Children:
  [
    Component CheckBox
    {
      #keys: '[113694.1.1943245893]'
      BaseType: 'CheckBox'
      Properties:
      [
        DataBinding: 'Dialog.Data.IsGridVisible'
        LayoutGroup: 'Editors'
        Text: 'Show grid'
      ]
    }
    #child: EditorGridPointDistance
    Component LabelGridPointDistance
    {
      #keys: '[113694.1.1943694284]'
      BaseType: 'Label'
      Properties:
      [
        FocusControl: 'EditorGridPointDistance'
        LayoutGroup: 'Labels'
        Shortcut: 'Alt+G'
        Text: '&Grid point distance'
        Transparent: true
      ]
    }
  ]
  Properties:
  [
    Text: 'General'
    ModeledStringList ChildOrdering
    {
      c: EditorGridPointDistance
      c: CheckBox
      c: LabelGridPointDistance
    }
  ]
}
