Quintiq file version 2.0
Component GroupPanelSmartPlanSetting
{
  #keys: '[136682.0.1835962589]'
  BaseType: 'GroupPanel'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 677 parent: 0 }
      GBFlow.Column { grow: 128 id: 245 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => lblnrofperiodssmartplan
        Position { startcolumn: 677 startrow: 190 endcolumn: 677 endrow: 190 }
      }
      GBElement
      {
        Component => /EditorNumberOfPeriodsSmartPlan
        Position { startcolumn: 245 startrow: 190 endcolumn: 245 endrow: 190 }
      }
    ]
    Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 190 parent: 0 }
    ]
  }
  Children:
  [
    Component lblnrofperiodssmartplan
    {
      #keys: '[136682.0.1835962590]'
      BaseType: 'Label'
      Properties:
      [
        Alignment: 'right'
        FocusControl: 'EditorNumberOfPeriodsSmartPlan'
        Shortcut: 'Alt+M'
        Text: 'Number of periods s&mart plan'
        Tooltip: '<html>The number of previous periods (including the current period) which the smart plan should consider when planning the supply of this PISPIP.<br>If set to 1, the smart plan will consider the selection and its upstream processes/stocking points within the same period and in any period required by the leadtime of the processes.<br>If set to a high value, the smart plan will consider the selection and its upstream processes/stocking points from the start of the horizon until the end of the selected period.</html>'
        Transparent: true
      ]
    }
    #child: EditorNumberOfPeriodsSmartPlan
  ]
  Properties:
  [
    Text: 'Smart plan settings'
    ModeledStringList ChildOrdering
    {
      c: lblnrofperiodssmartplan
      c: EditorNumberOfPeriodsSmartPlan
    }
  ]
}
