Quintiq file version 2.0
#root
#parent: LibMacroPlannerTCUI
OrphanComponent frmTaskmanager
{
  #keys: '[101472.1.2061988844]'
  BaseType: 'Form'
  Databinding: 'internal[ExternalModeledRunningTaskList]*'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 128 id: 1 parent: 0 }
      GBFlow.Column { grow: 0 id: 3 parent: 0 }
      GBFlow.Column { grow: 0 id: 4 parent: 0 }
      GBFlow.Column { grow: 0 id: 2 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => ListExternalModeledRunningTask
        Position { startcolumn: 1 startrow: 2 endcolumn: 1 endrow: 1 }
      }
      GBElement
      {
        Component => QueryGroupPanel
        Position { startcolumn: 3 startrow: 2 endcolumn: 2 endrow: 2 }
      }
      GBElement
      {
        Component => AbortTaskButton
        Position { startcolumn: 3 startrow: 4 endcolumn: 3 endrow: 4 }
      }
      GBElement
      {
        Component => FinishTaskButton
        Position { startcolumn: 4 startrow: 4 endcolumn: 4 endrow: 4 }
      }
    ]
    Gaps: [ left: 0 right: 0 top: 0 bottom: 0 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 2 parent: 0 }
      GBFlow.Row { grow: 0 id: 4 parent: 0 }
      GBFlow.Row { grow: 128 id: 1 parent: 0 }
    ]
  }
  Children:
  [
    #child: ListExternalModeledRunningTask
    #child: QueryGroupPanel
    Component AbortTaskButton
    {
      #keys: '[100828.0.15465386]'
      BaseType: 'Button'
      Properties:
      [
        LayoutGroup: 'Button'
        Shortcut: 'Alt+B'
        SizePosition: 'rt175 115 180 202'
        Text: 'A&bort'
      ]
    }
    Component FinishTaskButton
    {
      #keys: '[100828.0.15466624]'
      BaseType: 'Button'
      Properties:
      [
        LayoutGroup: 'Button'
        Shortcut: 'Alt+F'
        SizePosition: 'rt85 25 180 202'
        Text: '&Finish'
      ]
    }
  ]
  Properties:
  [
    Height: 290
    Image: 'MONITOR'
    IncludeInView: true
    InitialPlacement: 'workspace'
    Title: 'Task manager'
    Width: 1526
    ModeledStringList ChildOrdering
    {
      c: QueryGroupPanel
      c: ListExternalModeledRunningTask
      c: AbortTaskButton
      c: FinishTaskButton
    }
  ]
}
