Quintiq file version 2.0
#parent: pnlEndTime/durEndTimeOfDay
Response OnChanged () id:Response_pnlEndTime_durEndTimeOfDay_OnChanged
{
  #keys: '[131094.1.29050674]'
  CanBindMultiple: false
  DefinitionID: 'Responsedef_WebDateTimeFieldBase_OnChanged'
  QuillAction
  {
    Body:
    [*
      // Update the 'memory', but only when not all day, because otherwise it will be set to 0:00.
      if( not ckbIsAllDay.Checked() )
      {
        dhEndTimeOfDay.Data( this.Duration() );
      }
      
      Form.UpdateDuration();
      Form.UpdateTextualInfo();
    *]
    GroupServerCalls: false
  }
}
