Quintiq file version 2.0
#parent: #root
Method SetLabels () id:Method_DialogCreateEditSafetyStock_SetLabels
{
  #keys: '[136682.2.183923981]'
  Body:
  [*
    // Set label quantity with unit of measure
    product := SelectionProduct.Data();
    productuom := guard( product.UnitOfMeasureName(), '' );
    pisp := select( product, ProductInStockingPoint_MP, pisp, pisp.StockingPoint_MP() = SelectionStockingPoint.Data() );
    
    uom := guard( pisp.UnitOfMeasureName(), productuom );
    
    // Set the label based on the translations
    LabelTargetInQuantity.Text( Translations::MP_DialogCreateEditSafetyStock_SafetyStockQty( uom ) );
  *]
}
