Quintiq file version 2.0
#parent: gt
Response OnTimer () id:Response_LibPTF_pnlTestController_gt_OnTimer
{
  #keys: '[101884.0.189400323]'
  Body:
  [*
    // Execute client and check for its status
    tests := dhSelectedScripts.Data()
    
    if( not isnull( tests )
        and tests.Size() > 0 )
    {
      tracker := lstExecutionTestScript.Strings();
      tracker := LibPTF_pnlTestController.PTF_CheckClientStatus( tests, tracker );
      tracker := LibPTF_pnlTestController.PTF_ExecuteClient( tests, tracker );
    
      lstExecutionTestScript.Strings( tracker );
    }
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_GUITimer_OnTimer'
}
