Quintiq file version 2.0
Component GroupPanelSustainability
{
  #keys: '[142576.0.163823425]'
  BaseType: 'GroupPanel'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 123 parent: 0 }
      GBFlow.Column { grow: 128 id: 774 parent: 0 }
      GBFlow.Column { grow: 0 id: 345 parent: 0 }
      GBFlow.Column { grow: 128 id: 387 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => LabelDefaultUoMOfCO2Emission
        Position { startcolumn: 123 startrow: 329 endcolumn: 123 endrow: 329 }
      }
      GBElement
      {
        Component => /SelectionCO2UoM
        Position { startcolumn: 774 startrow: 329 endcolumn: 774 endrow: 329 }
      }
      GBElement
      {
        Component => /SelectionCO2ProcessUoM
        Position { startcolumn: 387 startrow: 329 endcolumn: 387 endrow: 329 }
      }
      GBElement
      {
        Component => LabelPer
        Position { startcolumn: 345 startrow: 329 endcolumn: 345 endrow: 329 }
      }
    ]
    Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 329 parent: 0 }
    ]
  }
  Children:
  [
    Component LabelDefaultUoMOfCO2Emission
    {
      #keys: '[142576.0.163823439]'
      BaseType: 'Label'
      Properties:
      [
        Alignment: 'right'
        Text: 'Default UoM of CO2 emission'
        Tooltip: 'Default UoM to be used for defining CO2 emission rates and calculating the global KPI Total CO2 emission.'
        Transparent: true
      ]
    }
    #child: SelectionCO2UoM
    #child: SelectionCO2ProcessUoM
    Component LabelPer
    {
      #keys: '[142576.0.163823558]'
      BaseType: 'Label'
      Properties:
      [
        Text: 'per'
        Transparent: true
      ]
    }
  ]
  Properties:
  [
    Text: 'Sustainability'
    ModeledStringList ChildOrdering
    {
      c: LabelDefaultUoMOfCO2Emission
      c: SelectionCO2UoM
      c: SelectionCO2ProcessUoM
      c: LabelPer
    }
  ]
}
