Quintiq file version 2.0
#root
#parent: SOPWorkflow
OrphanComponent SWF_PanelWorkflowParameters
{
  #keys: '[107588.2015.1163573317]'
  BaseType: 'Panel'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 471 parent: 0 }
      GBFlow.Column { grow: 128 id: 492 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => CheckBoxIsWorkflowEnabled
        Position { startcolumn: 471 startrow: 959 endcolumn: 471 endrow: 959 }
      }
      GBElement
      {
        Component => GroupPanelCurrentDate
        Position { startcolumn: 471 startrow: 956 endcolumn: 492 endrow: 956 }
      }
      GBElement
      {
        Component => CheckBoxEnableSOAP
        Position { startcolumn: 471 startrow: 544 endcolumn: 471 endrow: 544 }
      }
    ]
    Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 959 parent: 0 }
      GBFlow.Row { grow: 0 id: 544 parent: 0 }
      GBFlow.Row { grow: 0 id: 956 parent: 0 }
    ]
  }
  Children:
  [
    Component CheckBoxIsWorkflowEnabled
    {
      #keys: '[107588.2015.1163574090]'
      BaseType: 'CheckBox'
      Properties:
      [
        DataBinding: 'SWF_WorkflowDataset.IsWorkflowEnabled'
        Text: 'Enable workflow support'
      ]
    }
    #child: GroupPanelCurrentDate
    Component CheckBoxEnableSOAP
    {
      #keys: '[107588.2015.1163603990]'
      BaseType: 'CheckBox'
      Properties:
      [
        DataBinding: 'SWF_WorkflowDataset.IsIntegrationEnabled'
        Text: 'Enable integration'
      ]
    }
  ]
  Properties:
  [
    Border: true
    ModeledStringList ChildOrdering
    {
      c: CheckBoxIsWorkflowEnabled
      c: CheckBoxEnableSOAP
      c: GroupPanelCurrentDate
    }
  ]
}
