Quintiq file version 2.0
Component Toolbar
{
  #keys: '[132252.0.7059984]'
  BaseType: 'Toolbar'
  GBLayout
  {
    Type: 'GBLayoutDefinition'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 135 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => ButtonRefresh
        Position { startcolumn: 135 startrow: 243 endcolumn: 135 endrow: 243 }
      }
    ]
    Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 243 parent: 0 }
    ]
  }
  Children:
  [
    Component ButtonRefresh
    {
      #keys: '[132252.0.7111154]'
      BaseType: 'Button'
      Properties:
      [
        Image: 'REFRESH'
      ]
    }
    Component GUITimer
    {
      #keys: '[132254.0.62212563]'
      BaseType: 'GUITimer'
      Properties:
      [
        Interval: 1000
        PosX: 35
        PosY: 5
      ]
    }
    Component DataHolderSanityManagersLocal
    {
      #keys: '[132254.0.62216166]'
      BaseType: 'DataHolder'
      Databinding: 'structured[SCK_Manager]*'
      Children:
      [
        Component GUIDataExtractorSanityManagersLocal
        {
          #keys: '[132254.0.62217070]'
          BaseType: 'GUIDataExtractor'
          Properties:
          [
            Component: 'DataHolderSanityManagers'
            DataType: 'structured[SCK_Manager]'
            PosX: 10
            PosY: 10
            Transformation: 'Elements'
          ]
        }
      ]
      Properties:
      [
        PosX: 64
        PosY: 5
      ]
    }
  ]
  Properties:
  [
    Size: 36
    ModeledStringList ChildOrdering
    {
      c: ButtonRefresh
      c: GUITimer
      c: DataHolderSanityManagersLocal
    }
  ]
}
