Quintiq file version 2.0
Component PanelMQBMLB id:PanelMQBMLB_603
{
  #keys: '[415136.0.858621780]'
  BaseType: 'WebPanel'
  Children:
  [
    Component ddslMQBMLB
    {
      #keys: '[415136.0.858621781]'
      BaseType: 'WebDropDownStringList'
      Properties:
      [
        Label: 'MQB/MLB'
        Taborder: 0
      ]
    }
  ]
  Properties:
  [
    Orientation: 'horizontal'
    Taborder: 2
  ]
}
