Quintiq file version 2.0
Component pnlEndOfPeriod
{
  #keys: '[131094.1.99296903]'
  BaseType: 'WebPanel'
  Children:
  [
    Component ckbEndOfPeriod
    {
      #keys: '[131094.1.99296905]'
      BaseType: 'WebCheckbox'
      Properties:
      [
        FixedSize: true
        Label: 'End'
        NumberOfColumns: 0
        ShowPadding: false
        Taborder: 1
      ]
    }
    Component lblMarginLeft_2
    {
      #keys: '[131094.1.99296906]'
      BaseType: 'WebLabel'
      Properties:
      [
        NumberOfColumns: 2
        ShowLabel: false
        Taborder: 0
      ]
    }
    Component durEndTimeOfDay id:durEndTimeOfDay_844
    {
      #keys: '[131094.1.120470872]'
      BaseType: 'WebDurationSelector'
      Properties:
      [
        CanBeNegative: false
        DurationFormat: 'h:m'
        MaxDuration: P0DT23H59M0S
        MinDuration: P0DT0H0M0S
        ShowLabel: false
        Taborder: 3
      ]
    }
    Component dsEndOfPeriod
    {
      #keys: '[131092.1.1288743620]'
      BaseType: 'WebDateSelector'
      Properties:
      [
        DateFormat: 'DMMY'
        Label: 'End'
        ShowLabel: false
        Taborder: 2
      ]
    }
  ]
  Properties:
  [
    FixedSize: true
    Orientation: 'horizontal'
    Taborder: 3
  ]
}
