Quintiq file version 2.0
Component Kpi_pnlDaemoSMSnapshotGenerator
{
  #keys: '[151892.3.141903337]'
  BaseType => //Kpi_pnlDaemon
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 220 parent: 220 }
      GBFlow.Column { grow: 0 id: 884 parent: 884 }
      GBFlow.Column { grow: 0 id: 168 parent: 168 }
      GBFlow.Column { grow: 0 id: 786 parent: 786 }
      GBFlow.Column { grow: 128 id: 831 parent: 831 }
      GBFlow.Column { grow: 0 id: 768 parent: 787 }
    ]
    Elements:
    [
      GBElement
      {
        Component => //Kpi_pnlDaemon/lblFrequency
        Position { startcolumn: 220 startrow: 973 endcolumn: 884 endrow: 973 }
      }
      GBElement
      {
        Component: 'dsFrequency'
        Position { startcolumn: 168 startrow: 973 endcolumn: 168 endrow: 973 }
      }
      GBElement
      {
        Component => //Kpi_pnlDaemon/lblRetentionPolicy
        Position { startcolumn: 220 startrow: 236 endcolumn: 884 endrow: 236 }
      }
      GBElement
      {
        Component => //Kpi_pnlDaemon/selectionRetentionPolicy
        Position { startcolumn: 168 startrow: 236 endcolumn: 768 endrow: 236 }
      }
      GBElement
      {
        Component => //Kpi_pnlDaemon/lblStartTime
        Position { startcolumn: 220 startrow: 222 endcolumn: 884 endrow: 222 }
      }
      GBElement
      {
        Component => //Kpi_pnlDaemon/dtStartTime
        Position { startcolumn: 168 startrow: 222 endcolumn: 768 endrow: 222 }
      }
      GBElement
      {
        Component => //Kpi_pnlDaemon/lblDescription
        Position { startcolumn: 220 startrow: 217 endcolumn: 884 endrow: 217 }
      }
      GBElement
      {
        Component => //Kpi_pnlDaemon/edtDescription
        Position { startcolumn: 168 startrow: 217 endcolumn: 768 endrow: 217 }
      }
      GBElement
      {
        Component: 'btnRecordSnapshot'
        Position { startcolumn: 768 startrow: 799 endcolumn: 768 endrow: 799 }
      }
      GBElement
      {
        Component: 'lblWarning'
        Position { startcolumn: 884 startrow: 647 endcolumn: 768 endrow: 647 }
      }
      GBElement
      {
        Component => //Kpi_pnlDaemon/imgWarning
        Position { startcolumn: 786 startrow: 973 endcolumn: 786 endrow: 973 }
      }
      GBElement
      {
        Component => //Kpi_pnlDaemon/imgWarningLabel
        Position { startcolumn: 220 startrow: 647 endcolumn: 220 endrow: 647 }
      }
    ]
    Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 647 parent: 592 }
      GBFlow.Row { grow: 128 id: 592 parent: 592 }
      GBFlow.Row { grow: 0 id: 236 parent: 236 }
      GBFlow.Row { grow: 0 id: 973 parent: 973 }
      GBFlow.Row { grow: 0 id: 222 parent: 222 }
      GBFlow.Row { grow: 0 id: 217 parent: 217 }
      GBFlow.Row { grow: 0 id: 799 parent: 799 }
    ]
  }
  Children:
  [
    Component lblWarning
    {
      #keys: '[146874.1.146354357]'
      BaseType => //Kpi_pnlDaemon/lblWarning
      IsDerived: true
      Properties:
      [
        Visible: false
      ]
    }
    Component vhKpiGlobalParameterRecordFrequency
    {
      #keys: '[146874.1.1166609710]'
      BaseType => //Kpi_pnlDaemon/vhKpiGlobalParameterRecordFrequency
      IsDerived: true
    }
    Component dsFrequency
    {
      #keys: '[146874.1.139348790]'
      BaseType => //Kpi_pnlDaemon/dsFrequency
      IsDerived: true
    }
    Component btnRecordSnapshot
    {
      #keys: '[146874.1.146350385]'
      BaseType => //Kpi_pnlDaemon/btnRecordSnapshot
      IsDerived: true
    }
  ]
}
