Quintiq file version 2.0
#parent: vhAutoClose
Response OnCreated () id:Response_LibPTF_pnlTestRunner_vhAutoClose_OnCreated
{
  #keys: '[104342.0.785071094]'
  Body:
  [*
    // Stores the flag indicating whether auto close the application is required upon completing running the test
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_GUIComponent_OnCreated'
}
