Quintiq file version 2.0
Component PTFPanelTestController
{
  #keys: '[136682.0.314428046]'
  BaseType => //LibPTF_pnlTestRunner
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 59 parent: 59 }
      GBFlow.Column { grow: 0 id: 60 parent: 60 }
      GBFlow.Column { grow: 0 id: 61 parent: 61 }
    ]
    Elements:
    [
      GBElement
      {
        Component => chkLoggedStartMarker
        Position { startcolumn: 60 startrow: 16 endcolumn: 60 endrow: 16 }
      }
      GBElement
      {
        Component => //LibPTF_pnlTestRunner/chkActionDone
        Position { startcolumn: 61 startrow: 16 endcolumn: 61 endrow: 16 }
      }
      GBElement
      {
        Component => btnPTFStatus
        Position { startcolumn: 59 startrow: 16 endcolumn: 59 endrow: 16 }
      }
    ]
    Gaps: [ left: 0 right: 0 top: 0 bottom: 0 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 16 parent: 16 }
    ]
  }
  Children:
  [
    Component chkLoggedStartMarker
    {
      #keys: '[102890.0.1865405313]'
      BaseType => //LibPTF_pnlTestRunner/chkLoggedStartMarker
      IsDerived: true
    }
    Component btnPTFStatus
    {
      #keys: '[104342.0.867766963]'
      BaseType => //LibPTF_pnlTestRunner/btnPTFStatus
      IsDerived: true
    }
  ]
}
