Quintiq file version 2.0
#parent: #root
Method GetDialogStayOpen () as Number id:Method_ApplicationLibMacroPlanner_GetDialogStayOpen
{
  #keys: '[11766.0.1773832567]'
  Body:
  [*
    //some dialogs will be opened during "configure empty view"
    //if we are using "show dialog" instead of "do model"
    //we need to set the user data to 999 so that it will not be automatically closed
    return 999;
  *]
}
