Quintiq file version 2.0
#parent: #root
Method ResetSupplyChainOverviewWarning () id:Method_ApplicationLibMacroPlanner_ResetSupplyChainOverviewWarning
{
  #keys: '[113694.2.1024232202]'
  Body:
  [*
    /* Value holder is reset to empty to indicate that no changes have
    been made with respect to the last redefined view */
    
    form := this.GetFormSupplyChainOverview();
    
    if( not isnull( form ) )
    {
      form.ResetSupplyChainOverviewWarning();
    }
  *]
}
