Quintiq file version 2.0
#parent: DataHolderProductInStockingPoints
Response OnDataChanged () id:Response_ApplicationLibMacroPlanner_DataHolderProductInStockingPoints_OnDataChanged
{
  #keys: '[127710.1.1989757222]'
  CanBindMultiple: false
  DefinitionID: 'Responsedef_GUIComponent_OnDataChanged'
}
