Quintiq file version 2.0
#parent: #root
Response OnOpenView () id:Response_ApplicationLibMacroPlanner_OnOpenView
{
  #keys: '[132444.0.53206350]'
  Body:
  [*
    // This event is fired when the user opens another view but the new view has yet been 
    // initialized, we set the current ToolbarSupplyChainPanel size so that the size is maintained in the
    // newly opened view
    size := ToolbarSupplyChainPanel.GetProperty( "Size" );
    ValueHolderNavigationPanelSize.Value( size );
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_Application_OnOpenView'
}
