Quintiq file version 2.0
Component TabPageAdvanced
{
  #keys: '[129684.0.185159607]'
  BaseType: 'TabPage'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 659 parent: 0 }
      GBFlow.Column { grow: 0 id: 747 parent: 0 }
      GBFlow.Column { grow: 0 id: 843 parent: 0 }
      GBFlow.Column { grow: 0 id: 185 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => LabelStandardDeviationLeadTime
        Position { startcolumn: 747 startrow: 349 endcolumn: 747 endrow: 349 }
      }
      GBElement
      {
        Component => GUIDurationSelectorStandardDeviationLeadTime
        Position { startcolumn: 843 startrow: 349 endcolumn: 843 endrow: 349 }
      }
      GBElement
      {
        Component => CheckBoxBatchEditStandardDeviation
        Position { startcolumn: 659 startrow: 349 endcolumn: 659 endrow: 349 }
      }
      GBElement
      {
        Component => LabelCO2Emission
        Position { startcolumn: 747 startrow: 799 endcolumn: 747 endrow: 799 }
      }
      GBElement
      {
        Component => /EditorCO2Emission
        Position { startcolumn: 843 startrow: 799 endcolumn: 843 endrow: 799 }
      }
      GBElement
      {
        Component => LabelDefaultCO2EmissionUoM
        Position { startcolumn: 185 startrow: 799 endcolumn: 185 endrow: 799 }
      }
      GBElement
      {
        Component => CheckBoxBatchEditCO2Emission
        Position { startcolumn: 659 startrow: 799 endcolumn: 659 endrow: 799 }
      }
    ]
    Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 349 parent: 0 }
      GBFlow.Row { grow: 0 id: 799 parent: 0 }
    ]
  }
  Children:
  [
    #child: EditorCO2Emission
    Component LabelStandardDeviationLeadTime
    {
      #keys: '[129684.0.185160568]'
      BaseType: 'Label'
      ViewSecurity: 'SafetyStockCalculation'
      Properties:
      [
        Alignment: 'right'
        FocusControl: 'GUIDurationSelectorStandardDeviationLeadTime'
        Shortcut: 'Alt+S'
        Text: '&Standard deviation lead time'
        Tooltip: 'This represents uncertainty in the lead time and is only relevant when calculation of safety stock levels is used.'
        Transparent: true
      ]
    }
    Component GUIDurationSelectorStandardDeviationLeadTime
    {
      #keys: '[129684.0.185160569]'
      BaseType: 'GUIDurationSelector'
      ViewSecurity: 'SafetyStockCalculation'
      Properties:
      [
        BackgroundColor: 'Window'
        CanBeNegative: false
        DataBinding: 'Dialog.Data.StandardDeviationLeadTimeOperation'
        LayoutGroup: 'Field'
      ]
    }
    Component CheckBoxBatchEditStandardDeviation
    {
      #keys: '[129684.0.185160570]'
      BaseType: 'CheckBox'
      ViewSecurity: 'SafetyStockCalculation'
      Properties:
      [
        Text: ''
      ]
    }
    Component LabelCO2Emission
    {
      #keys: '[142576.0.168113105]'
      BaseType: 'Label'
      Properties:
      [
        Alignment: 'right'
        FocusControl: 'EditorCO2Emission'
        Shortcut: 'Alt+C'
        Text: '&CO2 emission'
        Transparent: true
      ]
    }
    Component LabelDefaultCO2EmissionUoM
    {
      #keys: '[142576.0.168113158]'
      BaseType: 'Label'
      Properties:
      [
        DataBinding: 'Dialog.Data.Unit.MacroPlan.GlobalParameters_MP.DefaultCO2EmissionUoM'
        Text: ''
        Transparent: true
      ]
    }
    Component CheckBoxBatchEditCO2Emission
    {
      #keys: '[142576.0.168158725]'
      BaseType: 'CheckBox'
      Properties:
      [
        Text: ''
      ]
    }
  ]
  Properties:
  [
    Title: 'Advanced'
    ModeledStringList ChildOrdering
    {
      c: LabelStandardDeviationLeadTime
      c: CheckBoxBatchEditStandardDeviation
      c: GUIDurationSelectorStandardDeviationLeadTime
      c: CheckBoxBatchEditCO2Emission
      c: EditorCO2Emission
      c: LabelCO2Emission
      c: LabelDefaultCO2EmissionUoM
    }
  ]
}
