Quintiq file version 2.0
Component TabPageLotSize
{
  #keys: '[110880.8.191449037]'
  BaseType: 'TabPage'
  ViewSecurity: 'LotSizes'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 4 parent: 0 }
      GBFlow.Column { grow: 0 id: 9 parent: 0 }
      GBFlow.Column { grow: 128 id: 8 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => CheckBoxHasUserLotSize
        Position { startcolumn: 9 startrow: 1 endcolumn: 9 endrow: 1 }
      }
      GBElement
      {
        Component => /GroupPanelLotSize
        Position { startcolumn: 4 startrow: 2 endcolumn: 8 endrow: 2 }
      }
      GBElement
      {
        Component => CheckBoxBatchEditHasUserLotSize
        Position { startcolumn: 4 startrow: 1 endcolumn: 4 endrow: 1 }
      }
    ]
    Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 1 parent: 0 }
      GBFlow.Row { grow: 128 id: 2 parent: 0 }
    ]
  }
  Children:
  [
    Component CheckBoxHasUserLotSize
    {
      #keys: '[110880.8.191449039]'
      BaseType: 'CheckBox'
      ViewSecurity: 'LotSizes'
      Properties:
      [
        DataBinding: 'Dialog.Data.HasUserLotSize'
        Shortcut: 'Alt+V'
        Text: 'O&verride lot size of unit'
        Tooltip:
        [*
          By default the operation gets the lot size settings defined on its unit.
          Click here to override.
        *]
      ]
    }
    #child: GroupPanelLotSize
    Component CheckBoxBatchEditHasUserLotSize
    {
      #keys: '[110880.8.191449038]'
      BaseType: 'CheckBox'
      ViewSecurity: 'LotSizes'
      Properties:
      [
        Text: ''
      ]
    }
  ]
  Properties:
  [
    Title: 'Lot size'
    ModeledStringList ChildOrdering
    {
      c: CheckBoxBatchEditHasUserLotSize
      c: CheckBoxHasUserLotSize
      c: GroupPanelLotSize
    }
  ]
}
