Quintiq file version 2.0
#parent: Toolbar/btnOk
Response OnClick () id:Response_Toolbar_btnOk_OnClick
{
  #keys: '[113694.2.1011932042]'
  Body:
  [*
    // Submit data
    Dialog.SetAttributeBeforeApplyDate();
    Dialog.ApplyChanges();
    Dialog.EndModal(1);
  *]
  DefinitionID: 'Responsedef_GUIButtonBase_OnClick'
  Precondition:
  [*
    sanitycheckcategory := '';
    return ServiceLevel::ValidateInput( feedback,
                                            sanitycheckcategory,
                                            MacroPlan,
                                            Dialog.Data().WrappedInstance(),
                                            EditorName.Text(),
                                            ifexpr( CheckBoxProduct.Checked(), SelectionProduct.Data(), null(Product_MP) ),
                                            ifexpr( CheckBoxStockingPoint.Checked(), SelectionStockingPoint.Data(), null(StockingPoint_MP) ),
                                            ApplicationLibMacroPlanner.FormatStringToReal( EditorTargetPercentage.Text() ),
                                            GUIDateTimeSelectorStart.DateTime().Date(),
                                            GUIDateTimeSelectorEnd.DateTime().Date(),
                                            Translations::MP_GlobalParameters_KPIServiceLevelName()
                                            ); // the selection will be disabled when is for safety stock is true
  *]
}
