Quintiq file version 2.0
#root
#parent: LibMacroPlannerTCUI
OrphanComponent DialogCreateEditStockingPointCapacity
{
  #keys: '[105706.0.1096578198]'
  Accessibility: 'Extensible'
  BaseType: 'Dialog'
  Databinding: 'shadow[StockingPointCapacity]'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 2 parent: 0 }
      GBFlow.Column { grow: 0 id: 520 parent: 0 }
      GBFlow.Column { grow: 128 id: 3 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => Label2
        Position { startcolumn: 2 startrow: 5 endcolumn: 2 endrow: 5 }
      }
      GBElement
      {
        Component => SelectionStockingPoint
        Position { startcolumn: 520 startrow: 1 endcolumn: 3 endrow: 1 }
      }
      GBElement
      {
        Component => LabelMaxCapacity
        Position { startcolumn: 2 startrow: 3 endcolumn: 2 endrow: 3 }
      }
      GBElement
      {
        Component => EditorMaxCapacity
        Position { startcolumn: 520 startrow: 3 endcolumn: 3 endrow: 3 }
      }
      GBElement
      {
        Component => GUIStartDateTimeSelector
        Position { startcolumn: 520 startrow: 5 endcolumn: 3 endrow: 5 }
      }
      GBElement
      {
        Component => Label1
        Position { startcolumn: 2 startrow: 1 endcolumn: 2 endrow: 1 }
      }
      GBElement
      {
        Component => CheckBoxThisPeriodOnwards
        Position { startcolumn: 520 startrow: 659 endcolumn: 520 endrow: 659 }
      }
    ]
    Gaps: [ left: 10 right: 10 top: 10 bottom: 10 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 1 parent: 0 }
      GBFlow.Row { grow: 0 id: 5 parent: 0 }
      GBFlow.Row { grow: 0 id: 3 parent: 0 }
      GBFlow.Row { grow: 0 id: 659 parent: 0 }
    ]
  }
  Children:
  [
    Component LabelMaxCapacity
    {
      #keys: '[11660.0.474949886]'
      BaseType: 'Label'
      Properties:
      [
        Alignment: 'right'
        DataBinding: 'Dialog.Data.StockingPoint_MP.UnitOfMeasure_MP.Name'
        FocusControl: 'EditorMaxCapacity'
        FormatMask: 'Ma&x capacity (S)'
        NumberLines: 1
        SizePosition: 'lt68 109 100 116'
        Text: ''
      ]
    }
    #child: EditorMaxCapacity
    #child: SelectionStockingPoint
    Component Label1
    {
      #keys: '[105706.0.1096515809]'
      BaseType: 'Label'
      Properties:
      [
        Alignment: 'right'
        FocusControl: 'SelectionStockingPoint'
        NumberLines: 1
        Shortcut: 'Alt+K'
        SizePosition: 'lt42 125 35 51'
        Text: 'Stoc&king point'
        Tooltip: 'The items in the drop-down list are filtered based on the selection in the navigation panel.'
        Transparent: true
      ]
    }
    Component GUIStartDateTimeSelector
    {
      #keys: '[105706.0.1132120707]'
      BaseType: 'GUIDateTimeSelector'
      Properties:
      [
        BackgroundColor: 'White'
        DataBinding: 'Dialog.Data.Start'
        Format: 'DMMY'
        SizePosition: 'st115 28 61 87'
      ]
    }
    Component Label2
    {
      #keys: '[105706.0.1132122772]'
      BaseType: 'Label'
      Properties:
      [
        Alignment: 'right'
        FocusControl: 'GUIStartDateTimeSelector'
        NumberLines: 1
        Shortcut: 'Alt+S'
        SizePosition: 'lt86 114 68 84'
        Text: '&Start'
        Transparent: true
      ]
    }
    #child: Toolbar
    Component CheckBoxThisPeriodOnwards
    {
      #keys: '[132444.0.61902007]'
      BaseType: 'CheckBox'
      Properties:
      [
        Shortcut: 'Alt+W'
        Text: 'This period on&wards'
        Tooltip: 'If checked, the settings will apply from this period onwards and the capacity definitions of the later periods will be removed.'
      ]
    }
  ]
  Properties:
  [
    EnterButton: 'ButtonOk'
    EscapeButton: 'ButtonCancel'
    Height: 187
    InitialPlacement: 'floating'
    Title: 'Stocking point capacity'
    Width: 351
    ModeledStringList ChildOrdering
    {
      c: LabelMaxCapacity
      c: SelectionStockingPoint
      c: Label2
      c: GUIStartDateTimeSelector
      c: Label1
      c: EditorMaxCapacity
      c: CheckBoxThisPeriodOnwards
      c: Toolbar
    }
  ]
}
