Quintiq file version 2.0
#parent: #root
Method SetLabelQuantityAndCostUOM () id:Method_DialogCreateEditSupplySpecification_SetLabelQuantityAndCostUOM
{
  #keys: '[112884.0.305205550]'
  Body:
  [*
    // If the Selection product is empty, and if we set this label via data binding, the label will show empty string.
    
    uom := guard( SelectionUnit.Data().UnitOfMeasure_MP().Name(), MacroPlan.DefaultUnitOfMeasure().Name() );
    
    LabelTargetQuantity.Text( Translations::MP_Designer_TargetQuantityUOM( uom ) );
    LabelMinQuantity.Text( Translations::MP_Designer_MinQuantityUOM( uom ) );
    CheckBoxHasMaxQuantity.Text( Translations::MP_Designer_MaxQuantityUOM( uom ) );
  *]
}
