Quintiq file version 2.0
Component GroupPanelMaintenance
{
  #keys: '[121072.0.310455645]'
  BaseType: 'GroupPanel'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 543 parent: 0 }
      GBFlow.Column { grow: 0 id: 856 parent: 0 }
      GBFlow.Column { grow: 128 id: 821 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => LabelMaintenance
        Position { startcolumn: 543 startrow: 10 endcolumn: 543 endrow: 10 }
      }
      GBElement
      {
        Component => LabelTimeUnit
        Position { startcolumn: 543 startrow: 8 endcolumn: 543 endrow: 8 }
      }
      GBElement
      {
        Component => GUIMaintenanceDurationSelector
        Position { startcolumn: 856 startrow: 10 endcolumn: 856 endrow: 10 }
      }
      GBElement
      {
        Component => LabelDurationHelp
        Position { startcolumn: 821 startrow: 10 endcolumn: 821 endrow: 10 }
      }
      GBElement
      {
        Component => /StringSelectionTimeUnit
        Position { startcolumn: 856 startrow: 8 endcolumn: 821 endrow: 8 }
      }
    ]
    Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 8 parent: 0 }
      GBFlow.Row { grow: 0 id: 10 parent: 0 }
    ]
  }
  Children:
  [
    Component LabelTimeUnit
    {
      #keys: '[121072.0.310455646]'
      BaseType: 'Label'
      Properties:
      [
        Alignment: 'right'
        FocusControl: 'StringSelectionTimeUnit'
        LayoutGroup: 'Label'
        NumberLines: 1
        Shortcut: 'Alt+T'
        SizePosition: 'lt144 197 22 38'
        Text: '&Time unit'
        Tooltip: 'Maintenance decreases the available time per selected time unit with the set duration'
        Transparent: true
      ]
    }
    Component GUIMaintenanceDurationSelector
    {
      #keys: '[121072.0.310455651]'
      BaseType: 'GUIDurationSelector'
      Properties:
      [
        BackgroundColor: 'White'
        DataBinding: 'Dialog.Data.Maintenance'
        Format: 'h:m'
        MinDuration: '0:00:00'
        SizePosition: 'lt199 402 77 103'
      ]
    }
    Component LabelDurationHelp
    {
      #keys: '[121072.0.310455648]'
      BaseType: 'Label'
      Properties:
      [
        FocusControl: 'EditorEfficiency'
        NumberLines: 1
        SizePosition: 'lt265 305 83 99'
        Text: 'hh:mm'
      ]
    }
    Component LabelMaintenance
    {
      #keys: '[121072.0.310455647]'
      BaseType: 'Label'
      Properties:
      [
        Alignment: 'right'
        FocusControl: 'GUIMaintenanceDurationSelector'
        LayoutGroup: 'Label'
        NumberLines: 1
        Shortcut: 'Alt+M'
        SizePosition: 'lt51 186 82 98'
        Text: '&Maintenance per period'
        Tooltip: 'Maintenance decreases the available time per selected time unit with the set duration'
        Transparent: true
      ]
    }
    #child: StringSelectionTimeUnit
  ]
  Properties:
  [
    SizePosition: 'st10 15 90 201'
    Text: 'Maintenance'
    ModeledStringList ChildOrdering
    {
      c: LabelTimeUnit
      c: StringSelectionTimeUnit
      c: GUIMaintenanceDurationSelector
      c: LabelDurationHelp
      c: LabelMaintenance
    }
  ]
}
