Quintiq file version 2.0
Component GroupPanelShiftPatternAndMaxLoadPercentage
{
  #keys: '[121072.0.310452889]'
  BaseType: 'GroupPanel'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 454 parent: 0 }
      GBFlow.Column { grow: 0 id: 387 parent: 0 }
      GBFlow.Column { grow: 128 id: 67 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => /EditorMaxLoadPercentage
        Position { startcolumn: 67 startrow: 45 endcolumn: 67 endrow: 45 }
      }
      GBElement
      {
        Component => CheckBoxBatchEditMaxLoadPercentage
        Position { startcolumn: 454 startrow: 45 endcolumn: 454 endrow: 45 }
      }
      GBElement
      {
        Component => Label6
        Position { startcolumn: 387 startrow: 45 endcolumn: 387 endrow: 45 }
      }
      GBElement
      {
        Component => CheckBoxBatchEditMinimumLoadThreshold
        Position { startcolumn: 454 startrow: 378 endcolumn: 454 endrow: 378 }
      }
      GBElement
      {
        Component => LabelMinimumLoadThreshold
        Position { startcolumn: 387 startrow: 378 endcolumn: 387 endrow: 378 }
      }
      GBElement
      {
        Component => /EditorMinimumLoadThreshold
        Position { startcolumn: 67 startrow: 378 endcolumn: 67 endrow: 378 }
      }
    ]
    Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 378 parent: 0 }
      GBFlow.Row { grow: 0 id: 45 parent: 0 }
    ]
  }
  Children:
  [
    #child: EditorMaxLoadPercentage
    Component CheckBoxBatchEditMaxLoadPercentage
    {
      #keys: '[121072.0.310452892]'
      BaseType: 'CheckBox'
      Properties:
      [
        LayoutGroup: 'RightCheckbox'
        SizePosition: 'lt42 223 95 111'
        Text: ''
      ]
    }
    Component Label6
    {
      #keys: '[121072.0.310452890]'
      BaseType: 'Label'
      Properties:
      [
        Alignment: 'right'
        FocusControl: 'EditorMaxLoadPercentage'
        LayoutGroup: 'Label'
        Shortcut: 'Alt+X'
        Text: 'Ma&x load percentage'
        Tooltip: 'The maximum allowed utilization of the unit (set to >100% to allow overloading or to <100% to restrict utilization)'
        Transparent: true
      ]
    }
    Component CheckBoxBatchEditMinimumLoadThreshold
    {
      #keys: '[121072.0.310452893]'
      BaseType: 'CheckBox'
      Properties:
      [
        SizePosition: 'lt64 215 20 36'
        Text: ''
      ]
    }
    Component LabelMinimumLoadThreshold
    {
      #keys: '[121072.0.310452891]'
      BaseType: 'Label'
      Properties:
      [
        Alignment: 'right'
        FocusControl: 'EditorMinimumLoadThreshold'
        LayoutGroup: 'Label'
        Shortcut: 'Alt+I'
        Text: 'M&in load percentage'
        Tooltip: 'The minimum required utilization of the unit'
        Transparent: true
      ]
    }
    #child: EditorMinimumLoadThreshold
  ]
  Properties:
  [
    SizePosition: 'st10 15 337 463'
    Text: 'Load percentage'
    ModeledStringList ChildOrdering
    {
      c: CheckBoxBatchEditMinimumLoadThreshold
      c: EditorMinimumLoadThreshold
      c: CheckBoxBatchEditMaxLoadPercentage
      c: EditorMaxLoadPercentage
      c: LabelMinimumLoadThreshold
      c: Label6
    }
  ]
}
