Quintiq file version 2.0
Component TabPage147
{
  #keys: '[121072.0.310441760]'
  BaseType: 'TabPage'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 653 parent: 0 }
      GBFlow.Column { grow: 128 id: 209 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => /GroupPanelShiftPatternAndMaxLoadPercentage
        Position { startcolumn: 653 startrow: 201 endcolumn: 209 endrow: 201 }
      }
      GBElement
      {
        Component => /GroupPanelMaintenance
        Position { startcolumn: 653 startrow: 649 endcolumn: 209 endrow: 649 }
      }
      GBElement
      {
        Component => CheckBoxBatchEditMaintenance
        Position { startcolumn: 653 startrow: 754 endcolumn: 653 endrow: 754 }
      }
      GBElement
      {
        Component => /GroupPanelEfficiencyAndAllocation
        Position { startcolumn: 653 startrow: 379 endcolumn: 209 endrow: 379 }
      }
    ]
    Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 201 parent: 0 }
      GBFlow.Row { grow: 0 id: 379 parent: 0 }
      GBFlow.Row { grow: 0 id: 754 parent: 0 }
      GBFlow.Row { grow: 0 id: 649 parent: 0 }
    ]
  }
  Children:
  [
    #child: GroupPanelMaintenance
    Component CheckBoxBatchEditMaintenance
    {
      #keys: '[121072.0.310455652]'
      BaseType: 'CheckBox'
      Properties:
      [
        SizePosition: 'lt10 112 89 105'
        Text: 'Batch edit maintenance'
      ]
    }
    #child: GroupPanelEfficiencyAndAllocation
    #child: GroupPanelShiftPatternAndMaxLoadPercentage
  ]
  Properties:
  [
    Title: 'Advanced'
    ModeledStringList ChildOrdering
    {
      c: GroupPanelShiftPatternAndMaxLoadPercentage
      c: GroupPanelEfficiencyAndAllocation
      c: CheckBoxBatchEditMaintenance
      c: GroupPanelMaintenance
    }
  ]
}
