Quintiq file version 2.0
Component TabPage914
{
  #keys: '[121072.0.312645563]'
  BaseType: 'TabPage'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 121 parent: 0 }
      GBFlow.Column { grow: 0 id: 600 parent: 0 }
      GBFlow.Column { grow: 128 id: 506 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => /EditorNrOfUnitsOpen
        Position { startcolumn: 506 startrow: 721 endcolumn: 506 endrow: 721 }
      }
      GBElement
      {
        Component => CheckBoxBatchEditNrOfUnitsOpen
        Position { startcolumn: 121 startrow: 721 endcolumn: 121 endrow: 721 }
      }
      GBElement
      {
        Component => /EditorMaxLoadPercentage
        Position { startcolumn: 506 startrow: 980 endcolumn: 506 endrow: 980 }
      }
      GBElement
      {
        Component => LabelMaxLoadPercentage
        Position { startcolumn: 600 startrow: 980 endcolumn: 600 endrow: 980 }
      }
      GBElement
      {
        Component => CheckBoxBatchEditMaxLoadPercentage
        Position { startcolumn: 121 startrow: 980 endcolumn: 121 endrow: 980 }
      }
      GBElement
      {
        Component => LabelNrOfUnitsOpen
        Position { startcolumn: 600 startrow: 721 endcolumn: 600 endrow: 721 }
      }
    ]
    Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 980 parent: 0 }
      GBFlow.Row { grow: 0 id: 721 parent: 0 }
    ]
  }
  Children:
  [
    #child: EditorNrOfUnitsOpen
    Component CheckBoxBatchEditNrOfUnitsOpen
    {
      #keys: '[121072.0.312648579]'
      BaseType: 'CheckBox'
      Properties:
      [
        SizePosition: 'lt64 215 20 36'
        Text: ''
      ]
    }
    #child: EditorMaxLoadPercentage
    Component LabelMaxLoadPercentage
    {
      #keys: '[121072.0.312648582]'
      BaseType: 'Label'
      Properties:
      [
        Alignment: 'right'
        FocusControl: 'EditorMaxLoadPercentage'
        NumberLines: 1
        Shortcut: 'Alt+L'
        SizePosition: 'lt40 193 39 55'
        Text: 'Max &load percentage'
        Tooltip: 'The maximum allowed utilization of the unit (set to >100% to allow overloading or to <100% to restrict utilization)'
        Transparent: true
      ]
    }
    Component CheckBoxBatchEditMaxLoadPercentage
    {
      #keys: '[121072.0.312648583]'
      BaseType: 'CheckBox'
      Properties:
      [
        SizePosition: 'lt42 223 39 55'
        Text: ''
      ]
    }
    Component LabelNrOfUnitsOpen
    {
      #keys: '[121072.0.312648584]'
      BaseType: 'Label'
      Properties:
      [
        Alignment: 'right'
        FocusControl: 'EditorNrOfUnitsOpen'
        NumberLines: 1
        Shortcut: 'Alt+N'
        SizePosition: 'lt83 206 20 36'
        Text: 'Number of u&nits'
        Tooltip: '<html>Set to a number > 1 if this unit represents multiple identical resources.<br>For example, set the number of units to two to double the capacity</html'
        Transparent: true
      ]
    }
  ]
  Properties:
  [
    Title: 'Advanced'
    ModeledStringList ChildOrdering
    {
      c: CheckBoxBatchEditMaxLoadPercentage
      c: EditorMaxLoadPercentage
      c: CheckBoxBatchEditNrOfUnitsOpen
      c: LabelMaxLoadPercentage
      c: EditorNrOfUnitsOpen
      c: LabelNrOfUnitsOpen
    }
  ]
}
