Quintiq file version 2.0
#parent: #root
Method SetLabeMinCapacityAndLabelMaxCapacity () id:Method_DialogCreateEditUnitCapacity_SetLabeMinCapacityAndLabelMaxCapacity
{
  #keys: '[105706.0.1509555891]'
  Body:
  [*
    // Set LabelMinCapacity and LabelMaxCapacity accordingly when the time unit and length of time change.
    
    uom := guard( SelectionUnit.Data().UnitOfMeasure_MP().Name(), '' );
    period := 'period';
    
    if( StringSelectionTimeUnit.BoundValue().Length() > 0 )
    {
      period :=  StringSelectionTimeUnit.BoundValue().ToLower();
    }
    
    LabelMinCapacity.Text( Translations::MP_Designer_MinCapacity( uom, period ) );
    LabelMaxCapacity.Text( Translations::MP_Designer_MaxCapacity( uom, period ) );
  *]
}
