Quintiq file version 2.0
Component GroupPanel1
{
  #keys: '[110880.6.1472652478]'
  BaseType: 'GroupPanel'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 9 parent: 0 }
      GBFlow.Column { grow: 0 id: 8 parent: 0 }
      GBFlow.Column { grow: 0 id: 10 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => ButtonAutoScalingSettings
        Position { startcolumn: 10 startrow: 11 endcolumn: 10 endrow: 11 }
      }
      GBElement
      {
        Component => RadioButtonGroupAutoScalingFrequency
        Position { startcolumn: 9 startrow: 14 endcolumn: 8 endrow: 14 }
      }
      GBElement
      {
        Component => LabelRunAutomaticScaling
        Position { startcolumn: 9 startrow: 11 endcolumn: 9 endrow: 11 }
      }
    ]
    Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 11 parent: 0 }
      GBFlow.Row { grow: 0 id: 14 parent: 0 }
    ]
  }
  Children:
  [
    Component ButtonAutoScalingSettings
    {
      #keys: '[122872.0.1897830260]'
      BaseType: 'Button'
      Properties:
      [
        Image: 'WRENCH'
        Tooltip: 'Edit automatic scaling parameters'
      ]
    }
    Component RadioButtonGroupAutoScalingFrequency
    {
      #keys: '[122872.0.1944963129]'
      BaseType: 'RadioButtonGroup'
      Properties:
      [
        BoundValue: 'Frequency'
        ButtonLabels: '&Always;N&ever;&Frequency based (Default)'
        ButtonValues: 'Always;Never;Frequency'
        HasMemory: 'ViewsAndSettings'
      ]
    }
    Component LabelRunAutomaticScaling
    {
      #keys: '[122872.0.1944965904]'
      BaseType: 'Label'
      Properties:
      [
        Alignment: 'right'
        Text: 'Run the automatic scaling:'
        Transparent: true
      ]
    }
  ]
  Properties:
  [
    Text: 'Tuning'
    ModeledStringList ChildOrdering
    {
      c: ButtonAutoScalingSettings
      c: RadioButtonGroupAutoScalingFrequency
      c: LabelRunAutomaticScaling
    }
  ]
}
