Quintiq file version 2.0
Component GroupPanel
{
  #keys: '[108486.1.1034567591]'
  BaseType: 'GroupPanel'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 2 parent: 0 }
      GBFlow.Column { grow: 128 id: 1 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => /GroupPanel1
        Position { startcolumn: 2 startrow: 6 endcolumn: 1 endrow: 6 }
      }
      GBElement
      {
        Component => /GroupPanel2
        Position { startcolumn: 2 startrow: 7 endcolumn: 1 endrow: 7 }
      }
      GBElement
      {
        Component => Label12
        Position { startcolumn: 2 startrow: 8 endcolumn: 2 endrow: 8 }
      }
      GBElement
      {
        Component => /EditorDefaultMaxLoadPercentage
        Position { startcolumn: 1 startrow: 8 endcolumn: 1 endrow: 8 }
      }
    ]
    Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 6 parent: 0 }
      GBFlow.Row { grow: 0 id: 7 parent: 0 }
      GBFlow.Row { grow: 0 id: 8 parent: 0 }
    ]
  }
  Children:
  [
    #child: GroupPanel1
    #child: GroupPanel2
    Component Label12
    {
      #keys: '[108486.1.1034664378]'
      BaseType: 'Label'
      Properties:
      [
        Alignment: 'right'
        FocusControl: 'EditorDefaultMaxLoadPercentage'
        LayoutGroup: 'LabelDefaultValues'
        Shortcut: 'Alt+P'
        Text: 'Default max load &percentage'
        Transparent: true
      ]
    }
    #child: EditorDefaultMaxLoadPercentage
  ]
  Properties:
  [
    Text: 'Unit capacity'
    ModeledStringList ChildOrdering
    {
      c: GroupPanel1
      c: Label12
      c: GroupPanel2
      c: EditorDefaultMaxLoadPercentage
    }
  ]
}
