Quintiq file version 2.0
Component GroupPanel6
{
  #keys: '[110880.6.2136716260]'
  BaseType: 'GroupPanel'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 2 parent: 0 }
      GBFlow.Column { grow: 128 id: 3 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => LabelLowerBottleneckThreshold
        Position { startcolumn: 2 startrow: 2 endcolumn: 2 endrow: 2 }
      }
      GBElement
      {
        Component => /EditorLowerBottleneckThreshold
        Position { startcolumn: 3 startrow: 2 endcolumn: 3 endrow: 2 }
      }
      GBElement
      {
        Component => LabelUpperBottleneckThreshold
        Position { startcolumn: 2 startrow: 3 endcolumn: 2 endrow: 3 }
      }
      GBElement
      {
        Component => /EditorUpperBottleneckThreshold
        Position { startcolumn: 3 startrow: 3 endcolumn: 3 endrow: 3 }
      }
    ]
    Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 2 parent: 0 }
      GBFlow.Row { grow: 0 id: 3 parent: 0 }
    ]
  }
  Children:
  [
    Component LabelLowerBottleneckThreshold
    {
      #keys: '[110880.6.2136717994]'
      BaseType: 'Label'
      Properties:
      [
        Alignment: 'right'
        FocusControl: 'EditorLowerBottleneckThreshold'
        LayoutGroup: 'LabelBottleneckDetection'
        NumberLines: 1
        Shortcut: 'Alt+L'
        SizePosition: 'lt15 160 107 123'
        Text: '&Bottleneck threshold'
        Tooltip: 'Unit periods with utilization higher than the bottleneck threshold are marked as bottleneck and shown in yellow in the Capacity planning chart.'
      ]
    }
    #child: EditorLowerBottleneckThreshold
    Component LabelUpperBottleneckThreshold
    {
      #keys: '[110880.6.2136718537]'
      BaseType: 'Label'
      Properties:
      [
        Alignment: 'right'
        FocusControl: 'EditorUpperBottleneckThreshold'
        LayoutGroup: 'LabelBottleneckDetection'
        NumberLines: 1
        Shortcut: 'Alt+V'
        SizePosition: 'lt15 160 141 157'
        Text: 'O&verload threshold'
        Tooltip: 'Unit periods with utilization higher than the overload threshold are shown in orange in the Capacity planning chart.'
      ]
    }
    #child: EditorUpperBottleneckThreshold
  ]
  Properties:
  [
    Text: 'Unit utilization thresholds'
    ModeledStringList ChildOrdering
    {
      c: EditorLowerBottleneckThreshold
      c: LabelUpperBottleneckThreshold
      c: EditorUpperBottleneckThreshold
      c: LabelLowerBottleneckThreshold
    }
  ]
}
