Quintiq file version 2.0
Component GroupPanel7
{
  #keys: '[110880.6.2136719356]'
  BaseType: 'GroupPanel'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 594 parent: 0 }
      GBFlow.Column { grow: 128 id: 9 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => Label16
        Position { startcolumn: 594 startrow: 2 endcolumn: 594 endrow: 2 }
      }
      GBElement
      {
        Component => GUIDurationSelectorBottleneckWindowStart
        Position { startcolumn: 9 startrow: 2 endcolumn: 9 endrow: 2 }
      }
      GBElement
      {
        Component => Label17
        Position { startcolumn: 594 startrow: 10 endcolumn: 594 endrow: 10 }
      }
      GBElement
      {
        Component => GUIDurationSelectorBottleneckWindowEnd
        Position { startcolumn: 9 startrow: 10 endcolumn: 9 endrow: 10 }
      }
      GBElement
      {
        Component => Label10
        Position { startcolumn: 594 startrow: 11 endcolumn: 594 endrow: 11 }
      }
      GBElement
      {
        Component => /EditorBottleneckTolerance
        Position { startcolumn: 9 startrow: 11 endcolumn: 9 endrow: 11 }
      }
    ]
    Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 2 parent: 0 }
      GBFlow.Row { grow: 0 id: 10 parent: 0 }
      GBFlow.Row { grow: 0 id: 11 parent: 0 }
    ]
  }
  Children:
  [
    Component Label16
    {
      #keys: '[110880.6.2136719952]'
      BaseType: 'Label'
      Properties:
      [
        Alignment: 'right'
        FocusControl: 'GUIDurationSelectorBottleneckWindowStart'
        LayoutGroup: 'LabelBottleneckDetection'
        Shortcut: 'Alt+S'
        Text: '&Start after'
        Tooltip: 'Start of the detection window with respect to the start of the planning.'
        Transparent: true
      ]
    }
    Component GUIDurationSelectorBottleneckWindowStart
    {
      #keys: '[110880.6.2136719953]'
      BaseType: 'GUIDurationSelector'
      Properties:
      [
        BackgroundColor: 'Window'
        CanBeNegative: false
        DataBinding: 'Dialog.Data.BottleneckWindowStart'
        MinDuration: '0:00:00'
      ]
    }
    Component Label17
    {
      #keys: '[110880.6.2136719954]'
      BaseType: 'Label'
      Properties:
      [
        Alignment: 'right'
        FocusControl: 'GUIDurationSelectorBottleneckWindowEnd'
        LayoutGroup: 'LabelBottleneckDetection'
        Shortcut: 'Alt+E'
        Text: '&End after'
        Tooltip: 'End of the detection window with respect to the start of the planning.'
        Transparent: true
      ]
    }
    Component GUIDurationSelectorBottleneckWindowEnd
    {
      #keys: '[110880.6.2136719955]'
      BaseType: 'GUIDurationSelector'
      Properties:
      [
        BackgroundColor: 'Window'
        CanBeNegative: false
        DataBinding: 'Dialog.Data.BottleneckWindowEnd'
        MinDuration: '0:00:00'
      ]
    }
    Component Label10
    {
      #keys: '[110880.6.2136719956]'
      BaseType: 'Label'
      Properties:
      [
        Alignment: 'right'
        FocusControl: 'EditorBottleneckTolerance'
        LayoutGroup: 'LabelBottleneckDetection'
        Shortcut: 'Alt+T'
        Text: 'Bottleneck &tolerance (%)'
        Tooltip: 'Units and stocking points with percentage of bottleneck periods in the detection window higher than specified tolerance are marked as bottleneck units.'
        Transparent: true
      ]
    }
    #child: EditorBottleneckTolerance
  ]
  Properties:
  [
    Text: 'Bottleneck detection window'
    ModeledStringList ChildOrdering
    {
      c: GUIDurationSelectorBottleneckWindowStart
      c: GUIDurationSelectorBottleneckWindowEnd
      c: EditorBottleneckTolerance
      c: Label10
      c: Label16
      c: Label17
    }
  ]
}
