Quintiq file version 2.0
#root
#parent: LibMacroPlannerTCUI
OrphanComponent DialogGenerateUtilizationReport
{
  #keys: '[107654.0.854304741]'
  BaseType => /DialogGenerateBaseReport
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 10 parent: 10 }
      GBFlow.Column { grow: 128 id: 15 parent: 11 }
      GBFlow.Column { grow: 0 id: 17 parent: 13 }
      GBFlow.Column { grow: 128 id: 18 parent: 14 }
      GBFlow.Column { grow: 0 id: 19 parent: 15 }
    ]
    Elements:
    [
      GBElement
      {
        Component => /DialogGenerateBaseReport/GUIDateTimeSelectorStart
        Position { startcolumn: 15 startrow: 7 endcolumn: 15 endrow: 7 }
      }
      GBElement
      {
        Component => /DialogGenerateBaseReport/LabelStartDate
        Position { startcolumn: 10 startrow: 7 endcolumn: 10 endrow: 7 }
      }
      GBElement
      {
        Component => /DialogGenerateBaseReport/LabelEndDate
        Position { startcolumn: 17 startrow: 7 endcolumn: 17 endrow: 7 }
      }
      GBElement
      {
        Component => /DialogGenerateBaseReport/GUIDateTimeSelectorEnd
        Position { startcolumn: 18 startrow: 7 endcolumn: 18 endrow: 7 }
      }
      GBElement
      {
        Component => /DialogGenerateBaseReport/LabelFormat
        Position { startcolumn: 10 startrow: 9 endcolumn: 10 endrow: 9 }
      }
      GBElement
      {
        Component => /DialogGenerateBaseReport/StringSelectionReportFormat
        Position { startcolumn: 15 startrow: 9 endcolumn: 19 endrow: 9 }
      }
      GBElement
      {
        Component => /DialogGenerateBaseReport/Button
        Position { startcolumn: 19 startrow: 7 endcolumn: 19 endrow: 7 }
      }
      GBElement
      {
        Component => EditorWarningCapacity
        Position { startcolumn: 15 startrow: 10 endcolumn: 19 endrow: 10 }
      }
      GBElement
      {
        Component => EditorOverloadCapacity
        Position { startcolumn: 15 startrow: 11 endcolumn: 19 endrow: 11 }
      }
      GBElement
      {
        Component => LabelWarningCapacity
        Position { startcolumn: 10 startrow: 10 endcolumn: 10 endrow: 10 }
      }
      GBElement
      {
        Component => LabelOverloadCapaciity
        Position { startcolumn: 10 startrow: 11 endcolumn: 10 endrow: 11 }
      }
    ]
    Gaps: [ left: 10 right: 10 top: 10 bottom: 10 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 9 parent: 9 }
      GBFlow.Row { grow: 0 id: 7 parent: 7 }
      GBFlow.Row { grow: 0 id: 10 parent: 0 }
      GBFlow.Row { grow: 0 id: 11 parent: 0 }
    ]
  }
  Children:
  [
    #child: EditorWarningCapacity
    #child: EditorOverloadCapacity
    Component LabelWarningCapacity
    {
      #keys: '[107654.0.854325476]'
      BaseType: 'Label'
      Properties:
      [
        FocusControl: 'EditorWarningCapacity'
        Shortcut: 'Alt+W'
        Text: '&Warning capacity'
        Transparent: true
      ]
    }
    Component LabelOverloadCapaciity
    {
      #keys: '[107654.0.854327253]'
      BaseType: 'Label'
      Properties:
      [
        FocusControl: 'EditorOverloadCapacity'
        Shortcut: 'Alt+V'
        Text: 'O&verload capacity'
        Transparent: true
      ]
    }
  ]
  Properties:
  [
    Height: 205
    Width: 529
    ModeledStringList ChildOrdering
    {
      c: Toolbar
      c: StringSelectionReportFormat
      c: LabelEndDate
      c: LabelStartDate
      c: GUIDateTimeSelectorStart
      c: GUIDateTimeSelectorEnd
      c: EditorWarningCapacity
      c: EditorOverloadCapacity
      c: LabelFormat
      c: LabelWarningCapacity
      c: Button
      c: LabelOverloadCapaciity
    }
  ]
}
