Quintiq file version 2.0
#root
#parent: LibMacroPlannerTCUI
OrphanComponent DialogInventoryOptimization
{
  #keys: '[122872.1.1871576585]'
  BaseType: 'Dialog'
  Databinding: 'shadow[DEPRECATED_InventoryOptimization]'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 128 id: 551 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => TabComponent
        Position { startcolumn: 551 startrow: 121 endcolumn: 551 endrow: 121 }
      }
    ]
    Gaps: [ left: 10 right: 10 top: 10 bottom: 10 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 128 id: 121 parent: 0 }
    ]
  }
  Children:
  [
    #child: Toolbar
    Component TabComponent
    {
      #keys: '[122872.2.266451128]'
      BaseType: 'TabComponent'
      Children:
      [
        #child: TabSettings
        #child: TabAdvanced
      ]
      Properties:
      [
        DoubleBuffering: false
        ModeledStringList ChildOrdering
        {
          c: TabSettings
          c: TabAdvanced
        }
      ]
    }
  ]
  Properties:
  [
    EnterButton: 'btnOk'
    EscapeButton: 'btnCancel'
    Height: 242
    Title: 'Run safety stock evaluation'
    Width: 416
    ModeledStringList ChildOrdering
    {
      c: TabComponent
      c: Toolbar
    }
  ]
}
