Quintiq file version 2.0
#parent: ListAssumption
Response OnDrop (
  internal[GUIViewBase] information,
  Assumption target
) id:Response_ListAssumption_OnDrop
{
  #keys: '[110880.3.1940111367]'
  Body:
  [*
    // Updates the view of an Assumption
    target.Update( information.Name() );
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_GUIComponent_OnDrop'
  UserRequiresReadWrite: true
}
