Quintiq file version 2.0
#root
#parent: LibMacroPlannerTCUI
OrphanComponent FormLibMon_MonitoringLibraryTopic
{
  #keys: '[139394.0.741922303]'
  BaseType: 'Form'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 654 parent: 0 }
      GBFlow.Column { grow: 128 id: 243 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => ListLibMon_Topic
        Position { startcolumn: 654 startrow: 533 endcolumn: 243 endrow: 533 }
      }
      GBElement
      {
        Component => ButtonCollectInfo
        Position { startcolumn: 654 startrow: 522 endcolumn: 654 endrow: 522 }
      }
    ]
    Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 522 parent: 0 }
      GBFlow.Row { grow: 128 id: 533 parent: 0 }
    ]
  }
  Children:
  [
    #child: ListLibMon_Topic
    Component ButtonCollectInfo
    {
      #keys: '[139394.0.743843630]'
      BaseType: 'Button'
      Properties:
      [
        Image: 'ELEMENT_REFRESH'
      ]
    }
  ]
  Properties:
  [
    Height: 411
    IncludeInView: true
    Title: 'Monitoring library topic'
    Width: 656
    WindowState: 'maximized'
    ModeledStringList ChildOrdering
    {
      c: ListLibMon_Topic
      c: ButtonCollectInfo
    }
  ]
}
