Quintiq file version 2.0
#parent: #root
Response OnClose () id:Response_FormOpenDialogEditGlobalParameter_OnClose
{
  #keys: '[113694.0.2005241678]'
  Body:
  [*
    // Edit global parameter
    /*
      Call global parameter dialog in here.
      Do not call the dialog on OnCreated as the dialog will pop-up before the view is switched completely.
    */
    dlg := construct( DialogEditGlobalParameter );
    dlg.Edit( MacroPlan.GlobalParameters_MP(), ApplicationLibMacroPlanner );
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_GUIContainerComponent_OnClose'
  Precondition:
  [*
    return MacroPlan::HasMacroPlan( MacroPlan, feedback );
  *]
}
