Quintiq file version 2.0
#parent: #root
Method SetDefaultValue () id:Method_FormProductPlanningMatrix_SetDefaultValue
{
  #keys: '[127710.1.837252011]'
  Body:
  [*
    // Set default planning start and end
    activeperiods := DataHolderActivePeriodsProductPlanningMatrix.Data();
    
    if( activeperiods.Size() > 0 )
    {
      DataHolderMatrixFrom.Data( activeperiods.Element( 0 ) );  
      DataHolderMatrixTo.Data( activeperiods.SelectLast( 1 ).Element( 0 ) );
    }
  *]
}
