Quintiq file version 2.0
#root
#parent: LibMacroPlannerTCUI
OrphanComponent FormStockingPointDashboard
{
  #keys: '[110880.5.1847860398]'
  Accessibility: 'Extensible'
  BaseType: 'Form'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 128 id: 1 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => SplitterWnd1
        Position { startcolumn: 1 startrow: 1 endcolumn: 1 endrow: 1 }
      }
    ]
    Gaps: [ left: 0 right: 0 top: 0 bottom: 0 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 128 id: 1 parent: 0 }
    ]
  }
  Children:
  [
    #child: SplitterWnd1
  ]
  Properties:
  [
    Height: 810
    HighlightRuleGroup: 'None'
    Image: 'HOME'
    IncludeInView: true
    InitialPlacement: 'workspace'
    Title: 'Stocking point dashboard'
    Width: 1205
    WindowState: 'maximized'
  ]
}
