Quintiq file version 2.0
#root
#parent: LibMacroPlannerTCUI
OrphanComponent FormTest
{
  #keys: '[132444.0.22681735]'
  BaseType: 'Form'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 0 id: 270 parent: 0 }
      GBFlow.Column { grow: 128 id: 777 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => Button
        Position { startcolumn: 270 startrow: 318 endcolumn: 270 endrow: 318 }
      }
      GBElement
      {
        Component => ListTestObject
        Position { startcolumn: 270 startrow: 315 endcolumn: 777 endrow: 315 }
      }
    ]
    Gaps: [ left: 0 right: 0 top: 0 bottom: 0 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 318 parent: 0 }
      GBFlow.Row { grow: 128 id: 315 parent: 0 }
    ]
  }
  Children:
  [
    #child: ListTestObject
    Component Button
    {
      #keys: '[132444.0.22826475]'
      BaseType: 'Button'
      Properties:
      [
        Image: 'delete2'
      ]
    }
  ]
  Properties:
  [
    Image: 'INJECTION'
    IncludeInView: true
    Title: 'Test'
    ModeledStringList ChildOrdering
    {
      c: Button
      c: ListTestObject
    }
  ]
}
