Quintiq file version 2.0
#parent: #root
Method SetDaemonFrequency () id:Method_LibOBT_frmRunTasks_SetDaemonFrequency
{
  #keys: '[112884.0.1223355419]'
  Body:
  [*
    // Set frequency of clearing the stucked run tasks
    ScenarioManager.LibOBT_Benchmarker().SetClearRunTaskDaemonDuration( GUIDurationSelectorDaemon.Duration() );
  *]
}
