Quintiq file version 2.0
#parent: #root
Method PTF_GUITimerStop () id:Method_LibPTF_pnlTestRunner_PTF_GUITimerStop
{
  #keys: '[105690.0.894049077]'
  Body:
  [*
    // Stop the GUITimer
    gtPTF.Enabled( false );
    this.PTF_SetCurrentExecutionStatus( LibPTF::ExecStatusStopped() );
  *]
}
