Quintiq file version 2.0
#parent: DataHolderSelectedUnit
Response OnDataChanged () id:Response_ListUnitTree_DataHolderSelectedUnit_OnDataChanged
{
  #keys: '[121072.0.313235828]'
  Body:
  [*
    // Syncrhonize the list selection
    ApplicationLibMacroPlanner.AutoExpandSelection( ListUnitTree, this.Data() );
    ApplicationLibMacroPlanner.AutoSelectElementsInList( ListUnitTree, this.Data() );
    
    // Workaround to trigger hiden context menu shortcut key
    MenuShowHideNode.Visible( true );
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_GUIComponent_OnDataChanged'
  Precondition:
  [*
    return ListUnitTree.UserData() = 1 // Work around on quintiq bug, the DataHolder on datachange is fired while the list is not completly loaded.
           and not isnull( this.Data() )
           and this.Data().Size() > 0;
  *]
}
