Quintiq file version 2.0
#root
#parent: LibMacroPlannerTCUI
OrphanComponent ScenarioManager_DialogResourceManager
{
  #keys: '[127238.1.54475267]'
  BaseType: 'Dialog'
  Databinding: 'shadow[ResourceManager_SM]'
  GBLayout
  {
    Type: 'internal[GBLayoutDefinition]'
    Columns:
    [
      GBFlow.Column { grow: 128 id: 203 parent: 0 }
    ]
    Elements:
    [
      GBElement
      {
        Component => LabelSizingParameters
        Position { startcolumn: 203 startrow: 932 endcolumn: 203 endrow: 932 }
      }
      GBElement
      {
        Component => GroupPanelScenarioManager
        Position { startcolumn: 203 startrow: 670 endcolumn: 203 endrow: 670 }
      }
      GBElement
      {
        Component => GroupPanelScenario
        Position { startcolumn: 203 startrow: 390 endcolumn: 203 endrow: 390 }
      }
      GBElement
      {
        Component => GroupPanelOptimizer
        Position { startcolumn: 203 startrow: 179 endcolumn: 203 endrow: 179 }
      }
    ]
    Gaps: [ left: 5 right: 5 top: 5 bottom: 5 inner: 5 ]
    Rows:
    [
      GBFlow.Row { grow: 0 id: 932 parent: 0 }
      GBFlow.Row { grow: 0 id: 670 parent: 0 }
      GBFlow.Row { grow: 0 id: 390 parent: 0 }
      GBFlow.Row { grow: 0 id: 179 parent: 0 }
    ]
  }
  Children:
  [
    #child: Toolbar714
    Component LabelSizingParameters
    {
      #keys: '[127238.1.54476515]'
      BaseType: 'Label'
      Properties:
      [
        NumberColumns: 30
        Text: ''
        TextColor: 'Black'
        Transparent: true
        WordWrap: true
      ]
    }
    #child: GroupPanelScenarioManager
    #child: GroupPanelScenario
    #child: GroupPanelOptimizer
  ]
  Properties:
  [
    EnterButton: 'btnOk'
    EscapeButton: 'btnCancel'
    Height: 387
    Title: 'Sizing parameters'
    Width: 579
    ModeledStringList ChildOrdering
    {
      c: LabelSizingParameters
      c: Toolbar714
      c: GroupPanelScenarioManager
      c: GroupPanelScenario
      c: GroupPanelOptimizer
    }
  ]
}
