Quintiq file version 2.0
#parent: #root
Method OnOK () id:Method_DialogCustomerDemandPPAIDS_OnOK
{
  #keys: '[415136.0.1022502154]'
  Body:
  [*
    // On ok 
    Form.ApplyChanges();
    
    currentuser  := QuintiqUser::CurrentUser().DisplayName();
    isactive     := ifexpr( rbgVersionFlag.BoundValue() = "true", true, false );
    if( efInterfacename.Text() = Translations::InterfaceDataset_CustomerDemandPPAIDS_Name() ){//客户需求
      CustomerDemandPPAIDS::GenerateData( InterfaceDataset, MacroPlan, currentuser );
    }
    if( efInterfacename.Text() = Translations::InterfaceDataset_AssemblyOnlinePlanPPPsPush_Name()){//装配上线
      AssemblyOnlinePlanPPPSPush::GenerateData( InterfaceDataset, MacroPlan, currentuser );
    }
    
    WebMessageBox::Success( "推送成功！" );
    Form.Close();
  *]
}
