Quintiq file version 2.0
#parent: vhAsyncActionStatus
Response OnValueChanged () id:Response_LibPTF_pnlTestRunner_vhAsyncActionStatus_OnValueChanged
{
  #keys: '[112938.0.754320553]'
  Body:
  [*
    // PTF MODELING HANDLE - Asynchronous action status indicator
    // Set the DataBinding property to a callback value to have the PTF resume its execution
    runner := LibPTF_pnlTestRunner;
    status := vhPTFExecutionStatus.Value();
    
    // Assuming that the ValueHolder is bound to an attribute like 'IsBusy', that indicates that an asynchronous action
    // has been triggered and the PTF has to wait. Waiting state is entered by using PTF_GUITimerPause().
    // When the asynchrone action is finished 'IsBusy' must be to false (in the model) which will trigger this response.
    if( not( status = LibPTF::ExecStatusStopped()
             or status = LibPTF::ExecStatusInactive()
           )
        and [Duration]this.Value() >= Duration::Zero() 
      )
    {
      // Resume GUI Timer
      runner.PTF_GUITimerResume();
    }
  *]
  CanBindMultiple: false
  DefinitionID: 'Responsedef_ValueHolder_OnValueChanged'
}
