Quintiq file version 2.0
#parent: PanelDateEnd/durEndTimeOfDay_812
Response OnChanged () id:Response_PanelHeader_144_durEndTimeOfDay_OnChanged_480
{
  #keys: '[415136.0.1066371682]'
  CanBindMultiple: false
  DefinitionID: 'Responsedef_WebDateTimeFieldBase_OnChanged'
  QuillAction
  {
    Body:
    [*
      // Update the 'memory', but only when not all day, because otherwise it will be set to 0:00.
      //if( not ckbIsAllDay.Checked() )
      //{
      //  dhEndTimeOfDay.Data( this.Duration() );
      //}
      //
      //Form.UpdateDuration();
      //Form.UpdateTextualInfo();
    *]
    GroupServerCalls: false
  }
}
